USE LOG_MIKROTIK;
SET @sql = CONCAT('ALTER TABLE LOG_MIKROTIK.Fibra RENAME LOG_MIKROTIK.Fibra_', DATE_FORMAT(CURDATE(), '%Y%m%d'));
PREPARE stmt FROM @sql;
EXECUTE stmt;

CREATE TABLE `Fibra` (
  `ID` int(11) NOT NULL AUTO_INCREMENT,
  `Tipo` text DEFAULT NULL,
  `Data` date DEFAULT NULL,
  `Ora` time DEFAULT NULL,
  `Host` varchar(255) DEFAULT NULL,
  `IndirizzoIP` varchar(45) DEFAULT NULL,
  `Messaggio1` text DEFAULT NULL,
  `Messaggio2` text DEFAULT NULL,
  `Messaggio3` text DEFAULT NULL,
  `Messaggio4` text DEFAULT NULL,
  PRIMARY KEY (`ID`)
) ENGINE=InnoDB AUTO_INCREMENT=1 DEFAULT CHARSET=latin1;

SET @sql = CONCAT('OPTIMIZE TABLE LOG_MIKROTIK.Fibra_', DATE_FORMAT(CURDATE(), '%Y%m%d'));
PREPARE stmt FROM @sql;
EXECUTE stmt;

truncate table DNS_CLI;
truncate table DNS;
truncate table ERRORI;


