-- ============================================
-- SCRIPT PULIZIA AUTOMATICA IP - DATABASE SERVER
-- Sistema DDoS Detection - Pulizia tabella ip_list
-- ============================================

-- Abilita eventi se non già attivi
SET GLOBAL event_scheduler = ON;

-- ============================================
-- 1. STORED PROCEDURE PER PULIZIA IP (GIORNI)
-- ============================================

DELIMITER //

DROP PROCEDURE IF EXISTS cleanup_ddos_ips//

CREATE PROCEDURE cleanup_ddos_ips(
    IN retention_days INT DEFAULT 7,
    IN list_name_filter VARCHAR(100) DEFAULT 'ddos_detect_v03',
    IN dry_run BOOLEAN DEFAULT FALSE
)
BEGIN
    DECLARE done INT DEFAULT FALSE;
    DECLARE total_ips INT DEFAULT 0;
    DECLARE old_ips INT DEFAULT 0;
    DECLARE deleted_count INT DEFAULT 0;
    
    -- Variabili per il report
    DECLARE report_message TEXT DEFAULT '';
    
    -- Gestione errori
    DECLARE CONTINUE HANDLER FOR SQLEXCEPTION
    BEGIN
        ROLLBACK;
        GET DIAGNOSTICS CONDITION 1
            @p1 = RETURNED_SQLSTATE, @p2 = MESSAGE_TEXT;
        INSERT INTO ip_cleanup_log (operation_time, operation_type, list_name, status, message)
        VALUES (NOW(), 'CLEANUP', list_name_filter, 'ERROR', CONCAT('ERRORE: ', @p2));
    END;
    
    -- Inizio transazione
    START TRANSACTION;
    
    -- Log inizio operazione
    INSERT INTO ip_cleanup_log (operation_time, operation_type, list_name, status, message)
    VALUES (NOW(), 'CLEANUP', list_name_filter, 'START', 
            CONCAT('Inizio pulizia - Ritenzione: ', retention_days, ' giorni - Dry run: ', dry_run));
    
    -- Conta totale IP nella lista
    SELECT COUNT(*) INTO total_ips
    FROM ip_list 
    WHERE list_name = list_name_filter;
    
    -- Conta IP da rimuovere
    SELECT COUNT(*) INTO old_ips
    FROM ip_list 
    WHERE list_name = list_name_filter
    AND retrieved_at < DATE_SUB(NOW(), INTERVAL retention_days DAY);
    
    -- Prepara messaggio report
    SET report_message = CONCAT(
        'Lista: ', list_name_filter, 
        ' | Totale IP: ', total_ips,
        ' | IP da rimuovere: ', old_ips,
        ' | Ritenzione: ', retention_days, ' giorni'
    );
    
    IF old_ips > 0 THEN
        IF dry_run = FALSE THEN
            -- Esegui pulizia reale
            DELETE FROM ip_list 
            WHERE list_name = list_name_filter
            AND retrieved_at < DATE_SUB(NOW(), INTERVAL retention_days DAY);
            
            -- Ottieni numero righe eliminate
            SET deleted_count = ROW_COUNT();
            
            -- Log successo
            INSERT INTO ip_cleanup_log (operation_time, operation_type, list_name, 
                                      records_before, records_removed, records_after, status, message)
            VALUES (NOW(), 'CLEANUP', list_name_filter, 
                   total_ips, deleted_count, (total_ips - deleted_count), 'SUCCESS',
                   CONCAT(report_message, ' | Rimossi: ', deleted_count));
                   
            SELECT CONCAT('✅ PULIZIA COMPLETATA: Rimossi ', deleted_count, ' IP dalla lista ', list_name_filter) as result;
            
        ELSE
            -- Modalità dry run - solo log
            INSERT INTO ip_cleanup_log (operation_time, operation_type, list_name, 
                                      records_before, records_removed, status, message)
            VALUES (NOW(), 'DRY_RUN', list_name_filter, 
                   total_ips, old_ips, 'INFO',
                   CONCAT(report_message, ' | SIMULAZIONE - Nessuna modifica eseguita'));
                   
            SELECT CONCAT('🔍 DRY RUN: Verrebbero rimossi ', old_ips, ' IP dalla lista ', list_name_filter) as result;
        END IF;
    ELSE
        -- Nessun IP da rimuovere
        INSERT INTO ip_cleanup_log (operation_time, operation_type, list_name, 
                                  records_before, records_removed, status, message)
        VALUES (NOW(), 'CLEANUP', list_name_filter, 
               total_ips, 0, 'INFO',
               CONCAT(report_message, ' | Nessun IP da rimuovere'));
               
        SELECT CONCAT('ℹ️ NESSUNA PULIZIA NECESSARIA: Tutti gli IP in ', list_name_filter, ' sono recenti') as result;
    END IF;
    
    -- Commit transazione
    COMMIT;
    
END//

-- ============================================
-- 1.2 STORED PROCEDURE PER PULIZIA IP (ORE) - NUOVA!
-- ============================================

DROP PROCEDURE IF EXISTS cleanup_ddos_ips_hours//

CREATE PROCEDURE cleanup_ddos_ips_hours(
    IN retention_hours INT DEFAULT 24,
    IN list_name_filter VARCHAR(100) DEFAULT 'ddos_detect_v03',
    IN dry_run BOOLEAN DEFAULT FALSE
)
BEGIN
    DECLARE done INT DEFAULT FALSE;
    DECLARE total_ips INT DEFAULT 0;
    DECLARE old_ips INT DEFAULT 0;
    DECLARE deleted_count INT DEFAULT 0;
    
    -- Variabili per il report
    DECLARE report_message TEXT DEFAULT '';
    
    -- Gestione errori
    DECLARE CONTINUE HANDLER FOR SQLEXCEPTION
    BEGIN
        ROLLBACK;
        GET DIAGNOSTICS CONDITION 1
            @p1 = RETURNED_SQLSTATE, @p2 = MESSAGE_TEXT;
        INSERT INTO ip_cleanup_log (operation_time, operation_type, list_name, status, message)
        VALUES (NOW(), 'CLEANUP_HOURS', list_name_filter, 'ERROR', CONCAT('ERRORE: ', @p2));
    END;
    
    -- Inizio transazione
    START TRANSACTION;
    
    -- Log inizio operazione
    INSERT INTO ip_cleanup_log (operation_time, operation_type, list_name, status, message)
    VALUES (NOW(), 'CLEANUP_HOURS', list_name_filter, 'START', 
            CONCAT('Inizio pulizia ORARIA - Ritenzione: ', retention_hours, ' ore - Dry run: ', dry_run));
    
    -- Conta totale IP nella lista
    SELECT COUNT(*) INTO total_ips
    FROM ip_list 
    WHERE list_name = list_name_filter;
    
    -- Conta IP da rimuovere (basato su ore)
    SELECT COUNT(*) INTO old_ips
    FROM ip_list 
    WHERE list_name = list_name_filter
    AND retrieved_at < DATE_SUB(NOW(), INTERVAL retention_hours HOUR);
    
    -- Prepara messaggio report
    SET report_message = CONCAT(
        'Lista: ', list_name_filter, 
        ' | Totale IP: ', total_ips,
        ' | IP da rimuovere: ', old_ips,
        ' | Ritenzione: ', retention_hours, ' ore'
    );
    
    IF old_ips > 0 THEN
        IF dry_run = FALSE THEN
            -- Esegui pulizia reale
            DELETE FROM ip_list 
            WHERE list_name = list_name_filter
            AND retrieved_at < DATE_SUB(NOW(), INTERVAL retention_hours HOUR);
            
            -- Ottieni numero righe eliminate
            SET deleted_count = ROW_COUNT();
            
            -- Log successo
            INSERT INTO ip_cleanup_log (operation_time, operation_type, list_name, 
                                      records_before, records_removed, records_after, status, message)
            VALUES (NOW(), 'CLEANUP_HOURS', list_name_filter, 
                   total_ips, deleted_count, (total_ips - deleted_count), 'SUCCESS',
                   CONCAT(report_message, ' | Rimossi: ', deleted_count));
                   
            SELECT CONCAT('✅ PULIZIA ORARIA COMPLETATA: Rimossi ', deleted_count, ' IP dalla lista ', list_name_filter, ' (>', retention_hours, 'h)') as result;
            
        ELSE
            -- Modalità dry run - solo log
            INSERT INTO ip_cleanup_log (operation_time, operation_type, list_name, 
                                      records_before, records_removed, status, message)
            VALUES (NOW(), 'DRY_RUN_HOURS', list_name_filter, 
                   total_ips, old_ips, 'INFO',
                   CONCAT(report_message, ' | SIMULAZIONE - Nessuna modifica eseguita'));
                   
            SELECT CONCAT('🔍 DRY RUN ORARIO: Verrebbero rimossi ', old_ips, ' IP dalla lista ', list_name_filter, ' (>', retention_hours, 'h)') as result;
        END IF;
    ELSE
        -- Nessun IP da rimuovere
        INSERT INTO ip_cleanup_log (operation_time, operation_type, list_name, 
                                  records_before, records_removed, status, message)
        VALUES (NOW(), 'CLEANUP_HOURS', list_name_filter, 
               total_ips, 0, 'INFO',
               CONCAT(report_message, ' | Nessun IP da rimuovere'));
               
        SELECT CONCAT('ℹ️ NESSUNA PULIZIA ORARIA NECESSARIA: Tutti gli IP in ', list_name_filter, ' sono più recenti di ', retention_hours, ' ore') as result;
    END IF;
    
    -- Commit transazione
    COMMIT;
    
END//

DELIMITER ;

-- ============================================
-- 2. TABELLA LOG OPERAZIONI PULIZIA (AGGIORNATA)
-- ============================================

DROP TABLE IF EXISTS ip_cleanup_log;
CREATE TABLE IF NOT EXISTS ip_cleanup_log (
    id INT AUTO_INCREMENT PRIMARY KEY,
    operation_time DATETIME NOT NULL,
    operation_type ENUM('CLEANUP', 'DRY_RUN', 'MAINTENANCE', 'CLEANUP_HOURS', 'DRY_RUN_HOURS') NOT NULL,
    list_name VARCHAR(100) NOT NULL,
    records_before INT DEFAULT 0,
    records_removed INT DEFAULT 0,
    records_after INT DEFAULT 0,
    status ENUM('START', 'SUCCESS', 'ERROR', 'INFO', 'WARNING') NOT NULL,
    message TEXT,
    INDEX idx_operation_time (operation_time),
    INDEX idx_list_name (list_name),
    INDEX idx_status (status),
    INDEX idx_operation_type (operation_type)
);

-- ============================================
-- 3. EVENTI AUTOMATICI MYSQL
-- ============================================

-- Evento principale: pulizia giornaliera alle 02:00
DROP EVENT IF EXISTS daily_ddos_cleanup;

CREATE EVENT daily_ddos_cleanup
ON SCHEDULE EVERY 1 DAY
STARTS TIMESTAMP(CURDATE() + INTERVAL 1 DAY, '02:00:00')
DO
BEGIN
    -- Pulizia lista principale (7 giorni)
    CALL cleanup_ddos_ips(7, 'ddos_detect_v03', FALSE);
    
    -- Pulizia altre liste se esistono
    CALL cleanup_ddos_ips(10, 'ddos_ia', FALSE);
    CALL cleanup_ddos_ips(15, 'ddos2-attackers', FALSE);
    CALL cleanup_ddos_ips(20, 'ddos3-attackers', FALSE);
END;

-- Evento settimanale: pulizia log vecchi (domenica alle 03:00)
DROP EVENT IF EXISTS weekly_log_cleanup;

CREATE EVENT weekly_log_cleanup
ON SCHEDULE EVERY 1 WEEK
STARTS TIMESTAMP(CURDATE() + INTERVAL (7 - WEEKDAY(CURDATE())) DAY, '03:00:00')
DO
BEGIN
    -- Rimuovi log di pulizia più vecchi di 30 giorni
    DELETE FROM ip_cleanup_log 
    WHERE operation_time < DATE_SUB(NOW(), INTERVAL 30 DAY);
    
    -- Log pulizia log
    INSERT INTO ip_cleanup_log (operation_time, operation_type, list_name, status, message)
    VALUES (NOW(), 'MAINTENANCE', 'SYSTEM', 'SUCCESS', 
            CONCAT('Pulizia log vecchi completata. Rimossi log più vecchi di 30 giorni.'));
END;

-- ============================================
-- 4. FUNZIONI DI UTILITÀ (AGGIORNATE)
-- ============================================

DELIMITER //

-- Funzione per ottenere statistiche IP con info orarie
DROP FUNCTION IF EXISTS get_ip_stats//

CREATE FUNCTION get_ip_stats(list_name_param VARCHAR(100))
RETURNS TEXT
READS SQL DATA
DETERMINISTIC
BEGIN
    DECLARE total_count INT DEFAULT 0;
    DECLARE old_count INT DEFAULT 0;
    DECLARE hour_1_count INT DEFAULT 0;
    DECLARE hour_12_count INT DEFAULT 0;
    DECLARE hour_24_count INT DEFAULT 0;
    DECLARE newest_date DATETIME;
    DECLARE oldest_date DATETIME;
    DECLARE result_text TEXT;
    
    SELECT COUNT(*), 
           MIN(retrieved_at), 
           MAX(retrieved_at)
    INTO total_count, oldest_date, newest_date
    FROM ip_list 
    WHERE list_name = list_name_param;
    
    -- Conta per diverse finestre temporali
    SELECT COUNT(*) INTO old_count
    FROM ip_list 
    WHERE list_name = list_name_param
    AND retrieved_at < DATE_SUB(NOW(), INTERVAL 7 DAY);
    
    SELECT COUNT(*) INTO hour_1_count
    FROM ip_list 
    WHERE list_name = list_name_param
    AND retrieved_at < DATE_SUB(NOW(), INTERVAL 1 HOUR);
    
    SELECT COUNT(*) INTO hour_12_count
    FROM ip_list 
    WHERE list_name = list_name_param
    AND retrieved_at < DATE_SUB(NOW(), INTERVAL 12 HOUR);
    
    SELECT COUNT(*) INTO hour_24_count
    FROM ip_list 
    WHERE list_name = list_name_param
    AND retrieved_at < DATE_SUB(NOW(), INTERVAL 24 HOUR);
    
    SET result_text = CONCAT(
        'Lista: ', list_name_param,
        ' | Totale: ', IFNULL(total_count, 0),
        ' | >1h: ', IFNULL(hour_1_count, 0),
        ' | >12h: ', IFNULL(hour_12_count, 0), 
        ' | >24h: ', IFNULL(hour_24_count, 0),
        ' | >7gg: ', IFNULL(old_count, 0),
        ' | Range: ', IFNULL(oldest_date, 'N/A'), ' - ', IFNULL(newest_date, 'N/A')
    );
    
    RETURN result_text;
END//

DELIMITER ;

-- ============================================
-- 5. VISTE DI MONITORAGGIO (AGGIORNATE)
-- ============================================

-- Vista per monitoraggio IP per lista con dettagli orari
CREATE OR REPLACE VIEW ip_list_summary AS
SELECT 
    list_name,
    COUNT(*) as total_ips,
    COUNT(CASE WHEN retrieved_at >= DATE_SUB(NOW(), INTERVAL 1 HOUR) THEN 1 END) as last_1h,
    COUNT(CASE WHEN retrieved_at >= DATE_SUB(NOW(), INTERVAL 12 HOUR) THEN 1 END) as last_12h,
    COUNT(CASE WHEN retrieved_at >= DATE_SUB(NOW(), INTERVAL 1 DAY) THEN 1 END) as last_24h,
    COUNT(CASE WHEN retrieved_at >= DATE_SUB(NOW(), INTERVAL 7 DAY) THEN 1 END) as last_7d,
    COUNT(CASE WHEN retrieved_at < DATE_SUB(NOW(), INTERVAL 1 HOUR) THEN 1 END) as older_1h,
    COUNT(CASE WHEN retrieved_at < DATE_SUB(NOW(), INTERVAL 12 HOUR) THEN 1 END) as older_12h,
    COUNT(CASE WHEN retrieved_at < DATE_SUB(NOW(), INTERVAL 1 DAY) THEN 1 END) as older_24h,
    COUNT(CASE WHEN retrieved_at < DATE_SUB(NOW(), INTERVAL 7 DAY) THEN 1 END) as older_7d,
    MIN(retrieved_at) as oldest_entry,
    MAX(retrieved_at) as newest_entry,
    risk_level,
    COUNT(*) as count_by_risk
FROM ip_list 
GROUP BY list_name, risk_level
ORDER BY list_name, risk_level;

-- Vista per log operazioni recenti (include operazioni orarie)
CREATE OR REPLACE VIEW recent_cleanup_operations AS
SELECT 
    operation_time,
    operation_type,
    list_name,
    records_before,
    records_removed,
    records_after,
    status,
    message
FROM ip_cleanup_log 
WHERE operation_time >= DATE_SUB(NOW(), INTERVAL 7 DAY)
ORDER BY operation_time DESC;

-- ============================================
-- 6. QUERY DI VERIFICA E MONITORAGGIO
-- ============================================

-- Query per verificare stato attuale
SELECT 'STATO ATTUALE IP_LIST CON DETTAGLI ORARI' as info;
SELECT * FROM ip_list_summary;

SELECT '' as spacer;
SELECT 'EVENTI ATTIVI' as info;
SHOW EVENTS LIKE '%cleanup%';

SELECT '' as spacer;
SELECT 'ULTIME OPERAZIONI PULIZIA (include orarie)' as info;
SELECT * FROM recent_cleanup_operations LIMIT 10;

-- ============================================
-- 7. COMANDI DI TEST (AGGIORNATI)
-- ============================================

-- Test dry run per vedere cosa verrebbe pulito (giorni)
-- CALL cleanup_ddos_ips(7, 'ddos_detect_v03', TRUE);

-- Test dry run per vedere cosa verrebbe pulito (ore)
-- CALL cleanup_ddos_ips_hours(1, 'ddos_detect_v03', TRUE);
-- CALL cleanup_ddos_ips_hours(12, 'ddos_detect_v03', TRUE);
-- CALL cleanup_ddos_ips_hours(24, 'ddos_detect_v03', TRUE);

-- Esecuzione manuale pulizia
-- CALL cleanup_ddos_ips(7, 'ddos_detect_v03', FALSE);
-- CALL cleanup_ddos_ips_hours(1, 'ddos_detect_v03', FALSE);

-- Statistiche per lista specifica (con info orarie)
-- SELECT get_ip_stats('ddos_detect_v03') as stats;

-- ============================================
-- FINE SCRIPT
-- ============================================ 